inhale.base.code.preserve Preserve old code when new base base release installed Allowed:true or false Default: true inhale.base.slave.preserve Preserve code in slave after base release Allowed:false or true Default: false inhale.sneeze.hosts hosts on which to inhaled system. Each host can have colon separated list of extensions ( for no extension) Allowed:valid host name with :ext : ext..

Default: none inhale.sneeze.< host >.rcmd Remote command to start sneeze on host Allowed:rsh or commands like ssh Default: rsh sneeze.host.aipsext.logfile name of sneeze log file (replace host.aipsext with your host and aipsext) Allowed:valid file name Default: none sneeze.host.aipsext.logmail address to mail the sneeze logfile to (replace host.aipsext with your host and aipsext) Allowed:valid mail address Default: AIPS++inhalenrao.edu sneeze.base.docs.preserve Preserve old documentation when new base release installed Allowed:true or false Default: true sneeze.base.< arch >.preserve Preserve old system when new base release installed Allowed:true or false Default: true

1.1.20 account - Tool Package utility Module aipsrcdata

AIPS++ account definitions – aipsmgr

Description The variables in this group have to be defined; they have no defaults. The values are given in the order ’user.group’. They will normally be defined in