Package display Module widgets

Test the autogui

Synopsis autoguitest()

Returns T

Description

This function provides a simple test of all widgets. A frame is contructed with all possible entry widgets. The frame has button for emitting the current values (Apply), Enabling and Disabling the widgets, and Clearing the values. If a new widget is introduced into autogui, it should be represented here in the test.

1.4.5 blinklabel - Tool Package display Module widgets

Glish/Tk label which can be made to blink include ”blinklabel.g”

Constructors

blinklabel Construct a blinklabel

Functions

blink Switch blinking on or off done Destroy ourselves

Description

This Glish/Tk widget simply provides a basic Glish/Tk label that can be made to blink. That is, on request, it will swap its text and background colors at a regular interval.

blinklabel - Constructor Package display Module widgets Tool blinklabel

Construct a blinklabel

Synopsis blinklabel(parent, text, justify, hlp, padx, pady, font, width, relief, borderwidth, foreground, background, anchor, fill, blink, interval, widgetset)

Arguments parent Parent of the label Allowed: Tk frame text label text Allowed: string Default: ’label’ justify justification of text Allowed: ’center’ ’left’ ’right’ Default: ’left’ hlp text for popuphelp Allowed: string Default: ” padx horizontal padding Allowed: dimension Default: 4 pady vertical padding Allowed: dimension Default: 2 font text font Allowed: X font Default: ” width width in character units Allowed: integer Default: 0 relief border relief Allowed: ‘flat’ ‘ridge’, ‘raised’ ‘sunken’ ‘groove’ Default: ’flat’ borderwidth border width Allowed: dimension Default: 2 foreground color of text Allowed: X color Default: ‘black’ background background color Allowed: X color Default: ‘lightgrey’ anchor location of text Allowed: ’c’ ’n’ ’s’ ’e’ ’w’ ’ne’ ’nw’ ’se’ ’sw’ Default: ’c’ fill how to expand when resized Allowed: ’x’ ’y’ ’both’ ’none Default: ’none’ blink whether to blink immediately Allowed: T F Default: F interval blink rate in seconds Allowed: float Default: 1 widgetset widgetserver to use to make label Allowed: widgetserver object Default: dws 343

Returns blinklabel widget

Description Constructs a blinklabel according to the specified construction arguments, and returns a ref to the widget.

Example

include ’blinklabel.g’
f := frame();
bl := blinklabel(f, ’flashdance’);

blinklabel.blink - Function Package display Module widgets Tool blinklabel

Switch blinking on or off

Synopsis blink(on, interval)

Arguments

on blinking on (T) or off (F) Allowed: T F Default: T interval blink interval in seconds Allowed: float Default: 1

Returns none

Description This function is used to switch blinking on or off, and optionally specify the blink interval in seconds.