Arguments

keyword Name of keyword Allowed:String Default: ’lastsave’

Returns Bool

Example

- include ’inputsmanager.g’
- inputs.save(’lastsave’)

1.8.5 clipboard - Tool Package utility Module tasking

clipboard object

Description

clipboard is a simple tool for saving and restoring glish variables. It’s mainly

of use for interacting with GUIs. Values can be copied to and from entry widgets. For example, to transfer a direction measure from the measures direction GUI to an entry in a tool, first use the Copy button on the direction GUI to place the value in the clipboard, and then use the Paste button in the Wrench menu of the direction entry to copy it into the entry. A paste into the Glish CLI can be performed using the paste function. Similarly a copy from the Glish CLI can be done using the copy. For example, to multiply the value in the clipboard by the √ 2, do:

include ’clipboard.g’
a: = dcb.paste()
a *:= sqrt(2.0)
dcb.copy(a);

This clipboard can only contain one value at a time, so you must copy and then paste one value at a time. Note that any glish variable can be placed in the clipboard. In the future, we may develop multiple entry clipboards if these are thought to be useful.

clipboard - Constructor

Package utility Module tasking Tool clipboard

Construct clipboard tool

Synopsis clipboard()

Description This constructor is called during startup. The default clipboard has the conventional name dcb. Normally only this clipboard is used.

clipboard.copy - Function

Package utility Module tasking Tool clipboard

Copy something to the clipboard

Synopsis copy(parameter)

Description Copy any glish variable to the clipboard.

Arguments

parameter Name of Glish parameter Allowed:Any glish variable Default: None