The general format of an aipsrc entry is:

keyword: value

where the keyword, which must begin in column 1, consists of a sequence of alphanumeric characters separated by asterisks or periods, and terminated by a colon. The value consists of everything after the last whitespace character (space or tab) following the colon. Asterisks may be used in the keyword for wildcarding, but note that in reading only the first match found is accepted, so that if the following two entries were present:

# Specify printer
printer*paper: A4
printer.dp1.paper: A3

and a match was requested for ’printer.dp1.paper’, the value returned would be ’A4’ rather than ’A3’. In fact, the second entry would never be operative. An ’#’ in the first column indicates a comment line.

The following categories the different groups of aipsrc variables available. The ones marked aipsmgr are of no importance to the normal user. Although categories are listed as tools, they aren’t. The tool environemnt is just being used as a convenience for documentation.

Tools

account AIPS++ account definitions – aipsmgr aipsview aipsview resources setup – user catalog catalog program details – user dish dish startup options - user help Help system setup – aipsmgr/(user) help.popup Popup help system setup – user inhale/sneeze Code distribution system – aipsmgr initialization Startup customization - user/site logger logger detailing values – user measures details for the measures operations – user measures.comet details for the comet data handling – user measures.directory details for the measures data handling – user measures.iers details for the IERS data handling – user measures.jpl details for the JPL ephemeris operations – user printer Postscript printer definitions – aipsmgr/user progress progress meter details – user system System resources setup – aipsmgr/user table Table System setup – aipsmgr/user toolmanager toolmanager program details – user unused details for unused program – aipsmgr/programmer user Detail user environment – user viewer viewer definitions

1.1.1 initialization - Tool 8