methods Collection of screen input records used by inputform Allowed:any valid record of screen input records title Label or window title of input form Allowed:Any String Default: AIPS++ Tab Input Form dismiss Dismiss flag Allowed:Flag to dismiss the form after returning from one of the action events Default: T parent The parent frame Allowed:Either F or the frame to put the tab-input form Default: F tabcount Number of functions that cause a list box to be used Allowed:any integer but should be less than 7 Default: 5 side Which side to pack the list box on Allowed:top, bottom, left, right Default: left

Description The function’s argument may have a two attributes, disallow and show. The disallow attributes tells the tabframe not to allow the array of functions to display or execute that function. The show option will gray out a function in the tab list rather than hide it.

Several utility functions are available via the guiutils module. include ”guicomponents.g”

Description

1.1.10 status line - Tool Package display Module guiutils

A one-line text widget for displaying status information. include ”guicomponents.g”

Description Many GUI programs will be easier to use if status information is displayed at appropriate times for the user to read. This very simple widget provides a convenient and standard way to do this.

Constructors

status line Construct a status line widget.

Functions

append Add text to the end of the current text. clear Remove all text from the widget. delete Destroy the status line widget show Clear the line, and display this message

status line - Constructor Package display Module guiutils Tool status line

Construct a status line widget.

Synopsis status line(parentFrame)

Arguments

parentFrame a glishtk frame widget

Returns a status line tool

status line.show - Function Package display Module guiutils Tool status line

Clear the line, and display this message

Synopsis show(message)

Arguments

message a new status message Allowed:any string

Returns T

Description

status line.clear - Function Package display Module guiutils Tool status line

Remove all text from the widget.

Synopsis clear()

Returns T

status line.append - Function

Package display Module guiutils Tool status line

Add text to the end of the current text.

Synopsis append(message)