If this graphical user interface tool created its own top-level frame, then this function disables (“greys”) that frame, sets the cursor to a “watch” icon, and returns T. Otherwise, it does nothing and returns F.

viewerstandardgui.enable - Function

Package display Module viewer Tool viewerstandardgui

Enable this graphical user interface

Synopsis enable()

Returns boolean

Description

If this graphical user interface tool created its own top-level frame, then this function enables (“ungreys”) that frame, returns the cursor to the standard pointer shape, and returns T. Otherwise, it does nothing and returns F.

1.3.9 viewerdatamanager - Tool Package display Module viewer

Tool for importing data into the Viewer include ”viewerdatamanager.g”

Description

The Data manager is a graphical user interface only tool to provide a context sensitive import of data into the Viewer tool. It is a front-end to the viewer.loaddata function in the Viewer tool.