T This function animates over all views of the Viewerdisplaydata tool. After this loop has been completed the Multipanel Crosshair tool will instantly cause an animation on the other panels, because there is no computation involved. Note: If axis labels are enabled there won’t be instant animation and you will notice a delay between moving your cursor and display on the other panels. Note: Once you have decided to execute this function you can’t stop it until it has finished.

1.3.8 viewerstandardgui - Tool Package display Module viewer

Interface for operating Viewer tool graphical user interfaces

Constructors

Functions

disable Disable this graphical user interface dismiss Hide this graphical user interface done Close down (finished with) this graphical user interface enable Enable this graphical user interface gui Map this graphical user interface ismapped Is this graphical user interface mapped to the screen or its parent frame? map Map the graphical user interface to the screen unmap Remove the graphical user interface from the screen

Description

This is not a tool. Instead, this simply defines an interface which is shared by all graphical user interfaces which are constructed by the Viewer tool or by its support tools.

viewerstandardgui.map - Function

Package display Module viewer Tool viewerstandardgui

Map the graphical user interface to the screen

Synopsis map(force)

Arguments

force force map even if this tool seems to be mapped already Allowed: boolean Default: F

Returns boolean

Description

This function should be used to map a graphical user interface to the screen. If the tool made its own top-level frame, then that frame will be mapped to the screen. Otherwise, the next highest level frame will be mapped into its parent frame, which itself may or may not be presently mapped to the screen. A boolean value of T is returned if an action was taken to map the GUI. Otherwise,

F is returned, implying that the tool believed itself to already be mapped.

viewerstandardgui.unmap - Function

Package display Module viewer Tool viewerstandardgui

Remove the graphical user interface from the screen

Synopsis unmap(force)

Arguments force force unmap even if this tool seems to be unmapped already Allowed: boolean Default: F

Returns boolean

Description

This function should be used to remove a graphical user interface from the screen. If the tool made its own top-level frame, then that entire frame will be removed from the screen. Otherwise, the next highest level frame will be removed from its parent frame, which itself may or may not be presently mapped to the screen. A boolean value of T is returned if an action was taken to unmap the GUI. Otherwise, F is returned, implying that the tool believed itself to already be unmapped.

viewerstandardgui.done - Function

Package display Module viewer Tool viewerstandardgui

Close down (finished with) this graphical user interface

Synopsis done()

Returns T

Description

If you no longer need to use this graphical user interface, calling this function will remove it from the screen, disable any interaction with it, and free up its resources. This function is called when the user presses the Dismiss button on the GUI if the GUI was constructed with hasdone=T and hasdismiss=F.

viewerstandardgui.ismapped - Function

Package display Module viewer Tool viewerstandardgui

Is this graphical user interface mapped to the screen or its parent frame?

Synopsis ismapped()

Returns boolean

Description

This function simply returns a boolean value of T which indicates that this graphical user interface is mapped to the screen (or into its parent frame), or F, meaning it is presently unmapped.

viewerstandardgui.dismiss - Function

Package display Module viewer Tool viewerstandardgui

Hide this graphical user interface

Synopsis dismiss()

Returns boolean

Description

This function simply calls unmap with force=F. The return value is the result of this invokation. This function is called when the user presses the Dismiss button on the GUI if the GUI was constructed with hasdismiss=T.

viewerstandardgui.gui - Function

Package display Module viewer Tool viewerstandardgui

Map this graphical user interface

Synopsis gui()

Returns boolean

Description

This function simply calls map with force=F. The return value is the result of this invokation.

viewerstandardgui.disable - Function

Package display Module viewer

Tool viewerstandardgui

Disable this graphical user interface

Synopsis disable()

Returns boolean

Description